0 200 400 600 800 1,000 0 20 40 60 80 100

ω (rad/s)

X_L (Ω)

X_L = ωL (L = 0,1 H)

0 200 400 600 800 1,000 0 20 40 60 80 100 120 140 160 180 200

ω (rad/s)

X_C (Ω)

X_C = 1/(ωC) (C = 1 mF)